         An Example of Task Oriented Empirical Evaluations of

3D-Display Modes

Sabine Volbracht

(University of Paderborn, Germany

sabaro@uni-paderborn.de)

Gitta Domik

(University of Paderborn, Germany

domik@uni-paderborn.de)

Khatoun Shahrbabaki

(SAP AG, Walldorf, Germany

khatoun.shahrbabaki@sap-ag.de)

Gregor Fels

(University of Paderborn, Germany

gf@chemie.uni-paderborn.de)

Abstract: The increasing availability of 3D input and output devices demands a better understan-

ding and comparison of their quality. This paper describes an empirical experiment that provides

quantitative results of the viewing quality of stereoscopic and perspective display modes. In this

study such results accuracy and time of eighty-one users were measured performing realistic 3D

tasks to research the structures of organic molecules. A subsequent comparison of cost vs. perfor-

mance can represent a meaningful help for decision-making of users and designers. The experi-

ment was designed and conducted in cooperation of computer and chemical scientists. The

experience of both sides was necessary to get a controlled testing environment with appropriate

tasks. The considered display modes were perspective mode, anaglyph mode and  shutter glass

stereomode . Additionally the effect of thelevel of expertiseof asubject onaccuracy and response

time were explored. Mean response errors and mean response times were computed separately by

a two-way analyses (ANOVA) for a series of six tasks and eighty-one subjects.

Key Words: output devices, 3D, display mode, empirical evaluation, stereo perception

1 Introduction

Over the past few years, 3D graphics has received a great deal of attention and is widely

acknowledged as a challenge in Scientific Visualization [Rosenblum 94], Computer

Graphics, HCI [Wanger, Ferwerda and Greenberg 92], VL [Ware and Franck 94], and

many other areas. 3D graphics as a meaningful visualization of data must fit syntax and

semantics of these data, support the visualization goals (task), conform to the problem

domain, adapt to the user as well as be adequately supported by available computer re-

Journal of Universal Computer Science, vol. 4, no. 5 (1998), 534-546 submitted: 24/7/97, accepted: 22/12/97, appeared: 28/5/98 © Springer Pub. Co.

Journal of Universal Computer Science, vol. 4, no. 5 (1998), 534-546 submitted: 24/7/97, accepted: 22/12/97, appeared: 28/5/98 © Springer Pub. Co.

sources, which determine visualization techniques and display modes [Domik and Gut-

kauf 94].

An important aspect of three-dimensional visualization is the observer´s perception of

depth. Against the many depth attributes to provide a sense of depth such as fading

brightness, perspective geometry, occlusion, transparency, change of brightness and ro-

tation/´rocking´ there is another interesting depth cue: stereopsis . Former developments

in computer technology have led to an increasing interest of stereo techniques. Ne-

vertheless these techniques require different capital expenditures in soft- and hardware,

and traditional visualization tools without any stereo technique are used in many areas

of science and technology. Consequently it is an interesting issue if stereo effects pro-

vide more expressiveness and effectiveness in comparison to the traditional display

techniques and what kind of display mode is adequate for a particular user.

In this context it is necessary to consider the everyday working environment and tasks

of the user to understand the goals which are associated with the use of certain I/O-tech-

nologies. This understanding is important, because different tasks and goals make dif-

ferent demands on I/O-devices. For example, an architectural walkthrough, obviously

requires an immersive display, whereas other tasks such as the examination of an object

in a CAD-system, may not improve by the use of an expensive immersive display. It

can be said, that a technology improves a task and is therefore adequate for a user when

the user can achieve the aspired goals through its use. But in most cases it isn´t obvious

what kind of task requires what kind of display mode. This aspect and the aspect of cost

limitations for the user show, that task oriented evaluations of I/O-technologies associa-

ted with defined application areas are needed to provide controlled testing environ-

ments for getting quantitative comparisons, which in turn are meaningful for the

decision-making of a potential buyer.

These considerations have led to the motivation of the following experiment. The ex-

periment was designed in cooperation with an expert in organic chemistry. The every-

dayworking environmentof an organic chemist includescomputer screens and 2d-mice

as traditional I/O-devices using perspective display modes. The general goal of an or-

ganic chemist by using chemical 3D-visualization systems is to get spatial information

aboutmolecule structuresin a fast and accurate way. Therefore we have chosen two ste-

reoscopic display modes anaglyph stereo and  shutter glass stereo mode  to compare

with the currently widely used perspective viewing mode . In our experiment we measu-

red accuracy and time during the performance of certain tasks. To understand the influ-

ence of the experience level with organic molecules on our test results, we used subjects

with different educational background. The tasks were taken from true research pro-

blems in organic chemistry. As visualization technique we have chosen the stick-model

(see Figure 1). The stick model was preferred by our chemists over (Kalotten) or ball-

and-stick models, because of its power to show overall 3D structure. However, lack of

depth cues in comparison to the alternatives makes the stick-model a challenge for 3D

viewing.

The three considered3D display modes ( perspective viewing , anaglyph stereo  and shut-

ter glass stereo ) were implemented as following:

1

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...

1

Perspective viewing: The molecules are projected onto a 2D plane using perspective

projection and color.

Anaglyph stereo: Two perspective views of the molecules are generated, a right-

and a left-eye perspective view with complementary colors

(red/green or red/blue). The observer uses glasses with red/

green or red/blue filters, respectively. Color can not be used for

carrying information about the molecules in this mode.

Shutter glass stereo: Two perspective views of the molecules are generated using the

same color scale as in the perspective molecule. Here the right-

and left-eye views of the molecules are presented alternately on

the screen with 120 Hz (60 right-eye views and 60 left-eye

views per second). The observer looks through StereoGraphics

CrystalEyes

Ò
 LCD shutter glasses.

Main differences of this experiment to previous studies in the area of 3D technology

evaluation (e.g.
                                                                                           [Beaton and Weinman 88]

,
[Hsu et al. 94

], [Ware and Franck 94], [Ware

and Franck 96]) are the choice of display modes, reducing of the testing environment to

one application area (organic chemistry), inclusion of experience level in the experi-

ment and consideration of cost vs. performance.

2 Basic Terms of Empirical Experiments

Let us first consider some common aspects of the motivation of using empirical expe-

riments. The individual reasons for choosing empirical experiments in research are dif-

ferent for diverse scientific areas. But all these areas have one common reason, namely

establishing clear cause-and-effect relationships. A clear cause-and-effect relationship

is shown when an observed effect is caused by a controlled factor, so that the researcher

doesn´t have to distinguish between various possibilities which could cause the effect.

In the area of computer science empirical experiments are frequently used to increase

user performance and consequently to enhance user satisfaction.

The following explanation of basic terms [Eberts 94] [Johnson 92] are helpful for the

reader to understand experimental designs.

Independent Variable : ^In an experiment, independent variables are those fac-

tors that are systematically varied by the experimenter

under controlled conditions.^ ... ^;a level  is a particular

value that the independent variable can take in the expe-

riment.^ [Johnson 92]

Dependent Variable : A dependent variable is that which is measured, e.g. re-

sponse time or response errors.

Confounding Variable : In an experiment there can be other factors which could

cause an effect on the dependent variables. These fac-

tors are known as extraneous variables  which must be

discounted by e.g. holding constant or absent. An extra-

3

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...

3

neous variable is called confounding variable when it

affects only one of the independent variable levels and

not all together. In those cases there is no clear cause-

and-effect relationship, because the experimenter can-

not determine if the differences between conditions are

due to independent or confounding variables. There are

different methods to control confounding variables in

an experiment.

Between-Subject Design : In the between-subject design different groups of sub-

jects are used in each condition of the experiment. So

the subject contributes just one score to the data analy-

sis.

Within-Subject Design : In the within-subject design the same group of subjects

is used in all conditions of the experiment. So repeated

measures are obtained from each subject.

In addition to the above terms there are a lot of components which must be considered

when designing an experiment, e.g. the experimenter has to formulate a research que-

stion, choose the experimental techniques or select the subjects.

3 The Experiment

The following experiment was developed in cooperation with an organic chemist. The

tested hypothesis, the used testing environment, the performing tasks as well as the vi-

sualization technique were choices which were made after strong consideration of the

chemical working environment and problem domain. Before the experiment a pretest

was conducted to verify the developed design to get a controlled environment. The ex-

perimental design was based on [Eberts 94] and
[Conte, Donsmore and Shen 86]

. Now the

experiment will be described in detail.

3.1 Research hypothesis

The research hypothese to be tested were:

1. shutter glass stereo viewing allows faster and more accurate recognition than ana-

                glyph and perspective viewing, and

2. subjects experienced with 3D representation of organic molecules are faster and

                more accurate than subjects with low or no experience.

3.2 Experimental design

The independent (´display mode´ and ´experience´) and dependent (´accuracy´ and

´time´) variables were defined by the research hypothesis. Consequently the design of

the experiment was a 3x3 factorial experiment with three classes of ´display mode´

5

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...

5

( perspective viewing, anaglyph stereo and shutter glass stereo ) and three levels of ´ex-

perience´ ( high, low, none experience ). This has led to 9 experimental conditions.

Beside the above variables there were some confounding variables which had to be con-

trolled. The expertise level could be a confounding variable. Because experience was

important to the results of the experiment it was made to be an independent variable.

Most of the following confounding variables were controlled by holding them constant

in one of two ways:either all subjects in allgroupswere treated exactly the same or sub-

jects were randomly assigned to groups. Some of the confounding variables were:

                                                       ¯ Expertise with chemical visualization systems

                                                       ¯ Complexity of molecules

                                                       ¯ Instrumentation

                                                       ¯ Amount of training

                                                       ¯ Distance to the computer screen

                                                       ¯ Knowing that one is being tested

                                                       ¯ Comparability of groups

                                                       ¯ Popularity of stereoscopic displays

Other possible confounds such as, ´Increasing improvement of the subject during the

course of the experiment´ were controlled by varying the order of the tasks and the

considered display modes. Additionally each task was combined with another molecu-

le. In this way we avoided subjects remembering the structure of molecules (`carryover

effect`).

3.3 The tasks

The following tasks had to be performed by the subjects.

T1. Identifying of rings in a simple molecule:

                                Count the rings in the molecule.

T2. Identifying of rings in a more complex molecule:

                                Count the rings in the molecule.

T3. Comparing distances of atoms in a simple molecule:

                                Which atom is the nearest and which one the most distant from the viewer?

T4. Comparing distances of rings in a complex molecule:

                                Determine the order of the benzene rings on the z-axis.

T5 . Positioning of a chemical ring:

                                Position the benzene ring parallel to the screen plane.

T6. Identifying of bezene rings:

                                Count the benzene rings in the molecule.

These tasks reflect three problems anorganic chemist (using 3D computer graphicspro-

gram) has in his/her work: the problem of identifying  objects, comparing  objects and

positioning  of an object. In all cases objects were atoms, rings or other chemical struc-

tures in a molecule. Comparing was referred to the comparison of distances.

7

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...

7

Identifying and comparing were each tested with a simple and a complex molecule to

understand the relationship between complexity and viewing. But in this context we

could only show a tendency, because the complexity of the molecules wasn´t an inde-

pendent variable. Two variations of complexity are not enough for showing significant

differences, but they can`t did show a tendency. Additionally another identification task

without interaction was considered. The particularity of this was the absence of hidden

relevant objects. That means the difference between the first two identifying tasks and

the lastone is the importance ofdepthinformationforidentifying.For the firsttwotasks

the depth information was very important for identifying rings, because the molecules

could not be positioned in a way that all rings could be seen clearly at the same time.

Some rings were always hidden. For the third identifying task all the relevant rings

could be seen clearly in the initial position. So rotating was not necessary.

Figure 1: Simple molecule used to answer T1: Count the rings in the molecule.

The experiment involved 81 participants. The subjects were students of Chemistry or

Computer Science. The students of Chemistry were divided into two groups. Students

of the first group were specialized in organic chemistry, so they had high experience in

viewing 3D representations of organic molecules. Students of the other group were spe-

cialized in other areas of chemistry so they had only low experience in viewing 3D mo-

lecules. The third group consisted of students of Computer Science which had no

experience with any kind of molecules.

One of the confounding variables given above which had to be controlled was, that a

subject was not allowed to perform the same task in all three display modes, because

the subject would know the special molecule of this task in the next mode. So a coun-

terbalancing procedure was necessary to distribute the six tasks among different sub-

jects and three display modes. Table 1 shows the chosen procedure for three

subjects.Table 1 shows that subject 1 for example has to perform only task one and two

in the perspective mode, whereas subject 2 performs task one and two in the anaglyph

mode and subject 3 in the shutter glass mode. The distribution of the other tasks are ana-

log the first two. This procedure was repeated nine times for each group with different

expertise level and 27 times for the whole experiment. This repetition of the above pro-

cedure has effected a between-subject design  for each task.

Therefore there were 81 measurements of time and errors from 81 different subjects for
each task. Table 2 shows the distribution of the 81 measurements among the nine expe-
rimental conditions.

3. 4 Procedure

Before beginning the experiment and before each task, the subjects received practice
time for a few minutes to become proficient with each 3D display mode and familiar
with the particular molecule. The tasks could performed interactively on each of the 3D
display modes. The interaction was restricted to molecule rotations with the mouse. An
objective comparison was based on the correct answers of the tasks and measured time
for answering.

Once the subject pressed a ´Start/Ready´ button, the interviewer explained the task, so
the subject didn´t have to write or to read during the session. After performing the task,
the subject pressed the ´Start/Ready´ button again to indicate the end of the trial. At that
time the response time and other necessary information were recorded.

The experiment was conducted in a chemical office room. The computer used to pro-
duce the display modes was an Indigo

2

, R4400/150 with ´Extreme Graphic´ of Silicon-

Graphics
                                                  Ò

                                                              and a 21´ monitor with stereo ability. The additional equipment used for the
stereo modes consisted of StereoGraphics CrystalEyes
Ò

 LCD shutter glasses and glas-
ses with red/green or red/blue filters for the anaglyph mode.

4 The Results

Because of the two independent variables a two-way Analysis of Variance (ANOVA)
with 9 experimental conditions consisting of the factorial combination of three classes
of display mode (perspective viewing, anaglyph stereo and shutter glass stereo) and

Perspective Anaglyph Shutter Glass

                                                                 Subject 1 T1, T2 T3, T4 T5, T6

                                                                 Subject 2 T5, T6 T1, T2 T3, T4

                                                                 Subject 3 T3, T4 T5, T6 T1, T2

                                                           Table 1:  Counterbalancing procedure for the six tasks T1, ..., T6

Perspective Anaglyph Shutter Glass

                   High Experience 9 9 9
S

 27

                   Low Experience 9 9 9
S

 27

                   None Experience 9 9 9
S

 27

S

 27

S

 27

S

 27

S

 81

                                                    Table 2:  Number of measurements for each experimental condition

9

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...

9

three levels of experience (high, low and none) were used for each task. Thereby mean
response errors and mean response times were computed separately. Following a New-
man-Keuls test (
                                                                                            a

                                                                                                      = 0.05) was applied for comparing the different mean times and er-
rors [Winer 71].

Table 3 and 4 summarize the main effect of display mode for all tasks, averaged over

27 subjects and three experience levels. In both cases (response errors and times) in-
teraction effects were not significant.

Error values are expressed as follows:

T1  (rings): Difference to the correct number of rings.The correct answer was 5 rings.

T2  (rings): Difference to the correct number of rings. The correct answer was 15 rings.

T3  (distance): Sum of error distances on the z-axis from the first and the last atom in

                    angstroms. The distance between these two atoms behaved on 10.78 angstroms.

T4  (distance): Sum of error distances on the z-axis from the centre of the benzene rings

                    in angstroms. For evaluation of this task the rings were arranged in increasing order

                    of z-distances and numbered. An error distance was only measured when in the or-

                    der of the subject a lower number followed a higher number.

                                                         Sum of error distances

                                                                               z-distances of ring i

                                                                               z-distances of ring j

 with  and

So the greatest error behaved on 15.48 angstroms (computed from 6! possibilities).

T5  (angle): Error angle in degrees.

T6  (rings): Difference to the correct number of rings. The correct answer was 8 rings.

T1

(rings)

T2

(rings)

(variance)

T3

(error
distance in
angstroms)

T4

(error
distance in
angstroms)

T5

(error
angle in
degrees

)

T6

(rings)

                                               Perspective

-0.30

0

10.46

4.266 4.380 11.78 -0.11

                                               Anaglyph

-0.04

-1.96

7.81

1.374 0.780 4.65 -0.67

                                               Shutter Glasses

-0.11

-1.15

5.90

1.167 0.579 4.75 -0,59

                                                                        Table 3:  Main effect of display mode (mean response error)

                       D

                               d
                                      ¼

                     z d i s t

                                               i

                                                   ¼

                      z d i s t

                                                j

                                                   ¼

                                                                        D

                                                                                d A B S z d i s t
i

z d i s t
j

˘
( )

                                                                                                          å

                                                                                             = i j
>

1 i j
,

6
£ £

11

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...

In the following discussion the degrees of freedom associated with all F-ratio are 2 and

72. So we will replace the usual notation ´F(2,72) =´ by ´F=´.

4.1 Identifying tasks

An interesting result was that for T1  significant differences between the three modes
occurred neither in the amount of errors nor in the measured response time, but rather
in experience levels for response time (F = 5.35, p = 0.0068). A Newman-Keuls test in-
dicated that Chemistry students specializing in organic chemistry were faster in iden-
tifying rings than students of Computer Science. The difference was strongly
significant.

     Figure 2: Frequencies of answers by display mode for P (perspective), A (anaglyph)
and S (shutter glasses), averaged over 27 subjects and 3 experience levels, by response

                                          error. The correct answers are represented by the underlined numbers.

In T2 , where the molecule was more complex, the main effect of display mode was si-
gnificant for response error (F = 3.43, p = 0.038) and for response time (F = 5.35, p =

0.0068). The results of a Newman-Keuls test showed that identifying in shutter and ana-
glyph mode was better than in perspective mode. The main effect of experience (F =

4.55, p = 0.014) had significant differences in response errors. A comparison of the ex-
perience levels proved that students with more experience in organics scored better than
the other groups.

T1

(seconds)

T2

(seconds)

T3

(seconds)

T4

(seconds)

T5

(seconds)

T6

(seconds)

                                           Perspective

26.75

91.84
92.77 137.07 78.48 33.69

                                           Anaglyph

22.40

66.93
70.86 90.37 58.32 45.87

                                           Shutter glasses

25.64

67.02
53.08 79.04 76.25 43.31

                                                                           Table 4:  Main effect of display mode (mean response time)

13

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...

Figure 3: Main effect of display mode for P (perspective), A (anaglyph) and S (shutter

                       glasses), averaged over 27 subjects and 3 experience levels, on response time.

An unexpected resultwas thatperspective viewing makes it easier to count bezene rings
as long as the information was not hidden ( T6 : response error: F = 4.33, p = 0.017; re-
sponse time: F = 4.78, p = 0.011). An explanation may be, that if third dimension
doesn´t provide any necessary information was not hidden ( T6 : response error: F =

4.33, p = 0.017; response time: F = 4.78, p = 0.011). An explanation may be, that if third
dimension doesn´t provide any necessary information it made the interpretation of the
visualization more difficult. We presume that in such a case a redundant visual cue de-
creases the effectiveness of a visualization. However, perspective viewing is often not
reliable, because information might be hidden.

4.2 Comparison tasks

Figure 4: Main effect of display mode on response error and time for P (perspective), A

   (anaglyph) and S (shutter glasses), averaged over 27 subjects and 3 experience levels.

As shown in Figure 4, the main effects of display mode for T3  (response error: F =

21.65, p < 0.0001; response time: F = 12.54, p < 0.0001) indicates that comparison of
small objects was considerably better in mean errors and times for shutter and anaglyph
mode than for perspective mode. Nevertheless in shutter mode the mean time was si-
gnificantlower than in the anaglyph mode. So the resultsshow that comparison of small
objects was better in shutter mode than in the other modes. By comparison of larger ob-

15

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...

jects ( T4 : response error: F = 18.80, p < 0.0001; response time: F = 14.47, p < 0.0001)
a Newman-Keuls test indicated that the differences of shutter and anaglyph mode were
not significant. The test showed as well that the differences in mean errors and times
between the stereo modes and perspective mode were strongly significant.

4.3 Positioning tasks

Another interesting outcome were the results of T5  (response error: F = 16.09, p <

0.0001; response time: F = 4.7 8, p = 0.011). The analysis of the obtained data showed
that positioning errors were considerably smaller in anaglyph and shutter mode than in
perspective mode but the position time was only significantly better in anaglyph mode.

The difference in mean time of shutter and perspective mode was not significant.

Figure 5: Main effect of display mode on response error and time for P (perspective), A

(anaglyph) and S (shutter glasses), averaged over 27 subjects and 3 experience levels.

5 Com parison of Cost vs. Perform ance

A comparison of cost vs. performance of I/O-technologies is important for users as well
as for designers of hard- and software. Such comparisons could help users in their de-
cision-making by finding out their adequate technology. Designers could use them also
for increasing usability. In thiscase the experiment provided an interestingoutcome. By
computing the accuracy as summary of correct answers from the five tasks T1 to T5 (ta-
sks with relevant depth information) and the needed time as mean response time of the
correct answers, the performance could be computed as accuracy over time. Figure 6
shows separately the accuracy and the mean response time.

Figure 6: Summary of correct answers from T1 to T5 and associated mean response
time for P (perspective), A (anaglyph) and S (shutter glasses). 100% is correlated with

135 (=5 x 27) correct answers with a low tolerance of errors.

Time [sec]

Journal of Universal Computer Science, vol. 4, no. 5 (1998), 534-546

submitted: 24/7/97, accepted: 22/12/97, appeared: 28/5/98 © Springer Pub. Co.

Journal of Universal Computer Science, vol. 4, no. 5 (1998), 534-546

submitted: 24/7/97, accepted: 22/12/97, appeared: 28/5/98 © Springer Pub. Co.

Thefollowingcomparison of costvs.performance (Figure 7)of the three here discussed

3D display modes would therefore favor anaglyph stereo. The reader should note that
the main disadvantage of anaglyph stereo, namely the lack of color attributes, is not
considered in this comparison. Though organic chemists prefer the use of color dis-
plays, their critical viewing tasks did not - to their own surprise - demand the use of co-
lor.

An important aspect for the stereo mode is the wearing of glasses. It could be an an-
noyance factor for the user by solving simple problems. But wearing red/green glasses
or shutter glasses is not as annoying as wearing e.g. a head-mounted display. And the
present research of 3D output devices promises a development of devices without ad-
ditionally wearing of equipment. Here the user has to decide what kind of display tech-
nology is adequate for the everyday working environment.

              Figure 7: Cost vs. performance for perspective mode, anaglyph mode and shutter

                                                                                          glass mode on a logarithmic scale of cost (Dec. 1996)

6 C onclusions and Future Work

As expected, viewing in the shutter glass stereo mode provided faster and more accurate
results in our experiment than the perspective viewing. But a very interesting outcome
was that viewing in the anaglyph mode shows a strong resemblance to the quality of
shutter mode.

Our experiment also demonstrated that user experience is relevant only for identifying
special objects. No indication was given that level of experience with special objects
changed the results on comparing or positioning tasks.

Finally, a tendency of the relationship between complexity and viewing is that by incre-
asing complexity the differences in accuracy and time between the perspective mode
and the two stereo modes also increases.

We expect visualization techniques similar to stick models but of other application are-

2146

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...

as, e.g. flow charts or networks, to obtain similar results.

Future work will center around the comparison of other technologies such as head-
mounteddisplaysor polarized methods. Another step isthe comparison of inputdevices
correlated with the display technologies.

R eferences

[Beaton and Weinman 88] Beaton, R. J., Weiman, N.: ^User evaluation of cursor positioning

                                       devices for 3D display workstations^; Three-Dimensional Imaging and Remote Sensing

                                       Imaging, Proc. SPIE. 902, (1988), 53-58.

[Conte, Donsmore and Shen 86] Conte, S. D., Donsmore, H. E., Shen, V. Y.: ^Software enginee-

                                       ring metrics and models^; Benjamin/Cummings Publishing Company Inc., (1986).

[Domik and Gutkauf 94] Domik, G., Gutkauf, B.: ^User modeling for adaptive visualization

                                       systems^; Proc. of the IEEE Conference Visualization (1994), 217-223.

[Eberts 94] Eberts, R. E.: ^User Interface Design ^; Prentice-Hall, Inc., (1994).

[Hsu et al. 94] Hsu, J., Pizlo, Z., Chelberg, C. M., Delp, E. J.: Design of Studies to Test the

                                       Effectiveness of Stereo Imaging Truth or Dare: Is Stereo Viewing Really Better?^; Ste-

                                       reoscopic Displays and Virtuel Reality Systems, Proc. SPIE, 2177, (1994), 211-222.

[Johnson 92] Johnson, P.: ^Human-Computer Interaction. Psychology, Task Analyses and Soft-

                                       ware Engineering.^ McGraw-Hill Book Company, London, (1992).

[Rosenblum 94] Rosenblum, L. J. (ed.): Research Issues in Scientific Visualization; ^Scientific

                                       Visualization^; Rosenblum et al; Academic Press, (1994).

[Wanger, Ferwerda and Greenberg 92] Wanger L. R., Ferwerda, J. A., Greenberg, D. P.: ^Per-

                                       ceiving Spatial Relationships in Computer-generated Images^; IEEE Computer Gra-

                                       phics & Applications, May , (1992), 44-58.

[Ware and Franck 94] Ware, C., Franck, G.: ^Viewing a Graph in a Virtual Reality Display is

                                       Three Times as Good as a 2d Diagram^; Proc. IEEE Symposium on Visual Languages,

                                       (1994).

[Ware and Franck 96] Ware, C., Franck, G.: ^Evaluating Stereo and Motion Cues for Visuali-

                                       zing Information Nets in Three Dimensions^; ACM Transactions on Graphics, 15, 2,

                                       (1996), 121-140.

[Winer 71] Winer, B. J.: Statistical Principles in Experimental Design. (second Edition).

                                       McGraw-Hill, New York, (1971).

Acknowledgement

We thank all participants of our experiment. This research was partly sponsored by the

Ministerium für Wissenschaft und Forschung in Nordrhein-Westfalen and SAP AG.

2148

Volbracht S., Domik G., Shahrbabaki K., Fels G.: An Example of ...